Copyright: (c) 1997-1999 ELSA AG


Inhalt
Ihr ELSA POWERdraft-Treiber

Bitte lesen Sie auch in der LIESMICH.TXT Datei den letzten Abschnitt Änderungen zur Hilfe Datei. Dort stehen möglicherweise neuere Informationen als in dieser Hilfe.

Schnellstart

Installation        Befehlsübersicht        POWERdraft Einstellungen        Versionen/letzte Änderungen        Technischer Support

Überblick

Mit POWERdraft for AutoCAD steht Ihnen eines der leistungsfähigsten Werkzeuge zur Produktivitätssteigerung unter AutoCAD R14 für Windows zur Verfügung.

Ihr POWERdraft-Treiber ist nahtlos in die AutoCAD-Benutzeroberfläche integriert und bietet gegenüber herkömmlicher Treibertechnologie bemerkenswerte Verbesserungen. Zunächst ist POWERdraft eine extrem schnelle und zuverlässige Treiberplattform für AutoCAD. Die Kombination aus bewährter 32-bit-Displaylist-Technologie und einer exakten Abstimmung auf Ihre ELSA-Grafikkarte stellt eine ausgezeichnete Lösung für anspruchsvollste AutoCAD für Windows-Benutzer dar.

Darüber hinaus beinhaltet Ihr POWERdraft-Treiber die leistungsfähigen Utilities MagniView, MultiView und das Cockpit, die entwickelt wurden, um die Arbeitsumgebung von AutoCAD sinnvoll zu ergänzen, ohne Ihre Arbeit zu behindern. Jedes Utility ist vollständig dynamisch und dank der Integration durch ELSAs SmartFocus-Technologie völlig transparent für AutoCAD und während jeder beliebigen AutoCAD-Operation nutzbar.

POWERdraft Cockpit

Das Cockpit ist ein unvergleichliches Werkzeug, das dynamische Zoom- und Pan-Operationen der aktuellen Ansicht mit einer kleinen Mausbewegung ermöglicht, sogar wenn es so klein skaliert wurde, daß es in den Scrolling-Bereich von AutoCAD paßt. Die beiden "Steuerknüppel" des Cockpits gestalten die Änderung Ihrer Ansicht so einfach wie möglich. Durch ELSAs SmartFocus-Technologie ist das Cockpit vollständig transparent und dynamisch und damit ein perfektes Werkzeug für die Feineinstellung Ihrer Ansicht während Sie arbeiten.

POWERdraft MultiView

MultiView ist in das Cockpit-Fenster integriert und bietet Ihnen eine konfigurierbare, grafische Auswahl Ihrer bisherigen Ansichten. Bis zu 100 frühere Ansichten können gespeichert werden, von denen MultiView jede als kleine Grafik auf einer Schaltfläche darstellt. Dies ermöglicht Ihnen schnellsten Zugriff auf jede frühere Ansicht und kann zur ständigen Aufzeichnung und Wiederherstellung gewählter Ansichten genutzt werden.

POWERdraft MagniView

MagniView ist eine einzigartige Lupe, die maximale Funktionalität bei kleinsten Abmessungen bietet. Durch ELSAs SmartFocus-Technologie ist MagniView nicht modal und folgt dem AutoCAD-Cursor mit einem dynamisch aktualisierten, vergrößerten Ausschnitt des Arbeitsbereichs. Diese vergrößerte Ansicht hilft dem Konstrukteur beim Zugriff auf AutoCAD-Objekte, einschließlich Griffen und anderer Bearbeitungsartefakte, oder bei der Suche nach bestimmten Informationen in der Zeichnung.

POWERdraft Werkzeugkasten

Über den ELSA Werkzeugkasten können Sie einfach per Mausklick einige POWERdraft-Befehle aufrufen.

Drücken Sie F1, um Hilfe zur Hilfefunktion zu erhalten.


Werkzeugkasten
POWERdraft Werkzeugkasten

Der POWERdraft Werkzeugkasten bietet schnellen und bequemen Zugriff auf einige POWERdraft spezifischen Befehle. Beim ersten Start von POWERdraft wird der Werkzeugkasten automatisch geöffnet.

Wenn der ELSA POWERdraft Werkzeugkasten geschlossen ist, können Sie ihn mit dem Befehl PdMenu oder einem Mausklick auf das ELSA-Logo im Cockpit-Fenster wieder öffnen. Bleibt der ELSA Werkzeugkasten dann immer noch unsichtbar, verwenden Sie den Befehl PdMenuOn.

Der Werkzeugkasten besitzt folgende Knöpfe:

	Öffnet/schließt das Cockpit - äquivalent zum Befehl PdCockpit
	Öffnet/schließt das MagniView - äquivalent zum Befehl PdMagniView
	Öffnet die ELSA POWERdraft Einstellungen - äquivalent zum Befehl PdConfig
	Öffnet die ELSA POWERdraft Hilfe - äquivalent zum Befehl PdHelp

Diese und weitere POWERdraft Befehle sind im Abschnitt Befehlsübersicht beschrieben.


MagniView

Überblick

Öffnen: Um POWERdraft MagniView zu öffnen, können Sie den Befehl PdMagniView oder das MagniView Symbol [image] im ELSA Werkzeugkasten verwenden (ist der Werkzeugkasten geschlossen, können Sie ihn mit dem Befehl PdMenu oder PdMenuOn öffnen). Sobald MagniView geöffnet ist, folgt es dem AutoCAD-Cursor in der aktuellen Ansicht und aktualisiert seine Anzeige dynamisch. MagniView zeigt den Vergrößerungsfaktor in einem editierbaren Feld dauernd an. Wenn Sie diesen Wert verändern, wird eine andere Vergrößerung eingestellt.

Eine Alternative, den Vergrößerungsfaktor zu setzen ist der Schieberegler am unteren Fensterrand des MagniView. Verschieben Sie den Regler, um den Faktor zu ändern; das Editierfeld zeigt den numerischen Wert unmittelbar an.

Um einen bestimmten Faktor einzustellen, können Sie den Befehl "PdMvSetm.n" eingeben, z.B. um den Faktor 3,5 einzustellen, geben Sie "PdMvSet3.5" ein.

Der Vergrößerungsfaktor kann LOKAL oder GLOBAL eingestellt werden. LOKAL erlaubt für jedes AutoCAD-Ansichtsfenster einen eigenen Vergrößerungsfaktor, der beim Wechsel des Fensters automatisch umgeschaltet wird. GLOBAL setzt einen Vergrößerungsfaktor für alle geöffneten Ansichtsfenster. Der Modus wird durch Doppelklicken des Anzeigefeldes umgeschaltet.

MagniView-Fenster

Die Titelleiste des MagniView-Fensters kann durch Doppelklicken der rechten Maustaste an einer beliebigen Stelle des Anzeigebereichs ein- und ausgeschaltet werden. Abschalten der Titelleiste vergrößert den Anzeigebereich von MagniView. Verschieben läßt sich das MagniView durch Anklicken und Ziehen der Anzeigefläche. Ein Doppelklick auf das grüne Rechteck schließt das MagniView.

Konfiguration

MagniView läßt sich innerhalb der POWERdraft Einstellungen Ihren Wünschen anpassen. Die vollständige Beschreibung finden Sie auf der entsprechenden Hilfeseite.


Cockpit

Überblick

Öffnen: Um das POWERdraft-Cockpit zu öffnen, verwenden Sie den Befehl PdCockpit oder das Cockpit Symbol [image] im ELSA Werkzeugkasten (ist der Werkzeugkasten geschlossen, können Sie ihn mit dem Befehl PdMenu oder PdMenuOn öffnen). Das Cockpit beinhaltet zwei "Steuerknüppel" und einen Schieberegler. Wenn MultiView aktiv ist, wird es ebenfalls in das Cockpit-Fenster integriert. Die "Steuerknüppel" werden für Zoom und Pan der aktuellen AutoCAD-Ansicht verwendet. Dieses Werkzeug ist insbesondere auf Bildschirmen nützlich, die wenig Platz bieten, da es vollständigen, dynamischen Zugriff auf Zoom und Pan auf engstem Raum ermöglicht.

Zusätzlich gibt es eine konfigurierbare Fernsteuerung für die Steuerknüppel. Dadurch muß man nicht den Mauszeiger über das Cockpit-Fenster bewegen, sondern kann die Zoom und Pan Funktionen über die Tastatur aktivieren. Die Fernsteuerfunktion steht nur zur Verfügung, wenn gleichzeitig das Cockpit mit den Steuerknüppeln geöffnet ist.

Dynamisches Panning

Zum Verschieben der aktuellen Ansicht wählen Sie einfach den Griff des zweidimensionalen Steuerknüppels, und bewegen Sie ihn mit der Maus. Die aktuelle Ansicht verschiebt sich in die Richtung, in die Sie den Hebel ziehen, mit einer Geschwindigkeit, die Proportional zur Winkelstellung des Hebels ist. Je weiter Sie den Griff des Steuerknüppels "drücken", desto schneller verschiebt sich die Ansicht.

Fernsteuerung: Um die aktuelle Ansicht per Fernsteuerung zu verschieben, drücken sie im Ansichtsfenster die konfigurierte Tastenkombination (z.B. <Strg> und <Shift>) und den konfigurierten Mausknopf (z.B. <linker Mausknopf>). Durch Bewegen der Maus verschiebt sich nun die Ansicht entsprechend, solange Sie den Mausknopf gedrückt halten (die Tastenkombination brauchen Sie während des Verschiebens nicht mehr gedrückt zu halten).

Die gewünschte Tasten-/Mausknopfkombination für die Fernsteuerung läßt sich innerhalb der POWERdraft Einstellungen konfigurieren.

Dynamischer Zoom

Zum Zoomen wählen Sie den Griff des kleineren, eindimensionalen Steuerknüppels. Drücken Sie den Hebel nach oben, um tiefer in die Zeichnung hineinzuzoomen, bzw. nach unten, um sich wieder herauszubewegen. Die Geschwindigkeit der Maßstabsänderung ist proportional zur Auslenkung des Steuerknüppels.

Fernsteuerung: Um die aktuelle Ansicht per Fernsteuerung zu zoomen, drücken sie im Ansichtsfenster die konfigurierte Tastenkombination (z.B. <Strg> und <Shift>) und den konfigurierten Mausknopf (z.B. <rechter Mausknopf>). Durch Bewegen der Maus können Sie nun entsprechend in die Ansicht hinein- oder aus ihr herauszoomen, solange Sie den Mausknopf gedrückt halten (die Tastenkombination brauchen Sie während des Zoomens nicht mehr gedrückt zu halten).

Das Zoomen per Fernsteuerung hat im Gegensatz zum direkten Zoomen im Cockpit eine Besonderheit:

Die aktuelle Cursorposition wird als "Zoompunkt" (Fixpunkt) verwendet, d.h. es wird in diesen Punkt hineingezoomt bzw. entsprechend herausgezoomt. Dadurch kann gleichzeitig zum Zoomen der Ansichtsmittelpunkt verschoben werden. Beim direkten Zoomen im Cockpit ist der Zoompunkt immer gleich dem Ansichtsmittelpunkt, so daß dieser fix ist.

Die gewünschte Tasten-/Mausknopfkombination für die Fernsteuerung läßt sich innerhalb der POWERdraft Einstellungen konfigurieren.

Beschleunigung

Um den Geschwindigkeitsbereich für Zoom und Pan einzustellen, stellen Sie den Schieberegler für die Beschleunigung ein. Je tiefer der Regler, desto kleiner ist die Maßstabs- oder Positionsänderung, die von den Steuerknüppeln ausgelöst wird.

Mit Hilfe der beiden Einträge Zoom und Pan der Gruppe Sensitivität innerhalb der POWERdraft Einstellungen können Sie zusätzlich den Geschwindigkeitsbereich für Zoom und Pan unabhängig voneinander beeinflussen. In der Regel brauchen Sie diese Faktoren aber nicht zu verändern.

Cockpit-Fenster

Die Titelleiste des Cockpit-Fensters kann durch Doppelklicken der rechten Maustaste über dem ELSA Logo ein- und ausgeschaltet werden. Abschalten der Titelleiste vergrößert den Anzeigebereich von MultiView. Wenn die Titelleiste eingeschaltet ist, läßt sich das Cockpit verschieben oder schließen. Mit abgeschalteter Titelleiste läßt es sich durch Anklicken und Ziehen des ELSA Logos verschieben. Ein Doppelklick auf das grüne Rechteck schließt das Cockpit.

Konfiguration

Das Cockpit läßt sich innerhal der POWERdraft Einstellungen Ihren Wünschen anpassen. Die vollständige Beschreibung finden Sie auf der entsprechenden Hilfeseite.


MultiView

Überblick

MultiView ist ein Element des Cockpit-Fensters, das Zugriff auf eine Auswahl früherer Ansichten gestattet. Jede Schaltfläche zeigt eine verkleinerte Darstellung der Ansicht, die über die Schaltfläche zurückgeholt werden kann. Die Anzahl der gespeicherten Ansichten kann innerhalb der POWERdraft Einstellungen festgelegt werden. Durch einfaches Anklicken der jeweiligen Schaltfläche wird die entsprechende Ansicht aufgerufen und im aktuellen AutoCAD-Ansichtsfenster dargestellt.

Fix-Knopf: Der Fix-Knopf befindet sich unterhalb des MultiView Bereiches links neben dem Hilfe-Knopf. Ist der Fix-Knopf ausgeschaltet, so wird bei jedem Ansichtswechsel (z.B. durch Zoom oder Pan) die letzte Ansicht automatisch gespeichert. Ist der Fix-Knopf eingeschaltet, wird das MultiView "eingefroren", d.h. es werden keine neuen Ansichten mehr gespeichert. Die vorhandenen Ansichten können selbstverständlich abgerufen werden. Beim Öffnen des Cockpits oder beim Laden einer neuen Zeichnung wird der Fix-Knopf automatisch ausgeschaltet.

Zusätzlich gibt es die Befehle PdCpFix (ein-/ausschalten des Fix-Knopfes) und PdCpAddView (speichern der aktuellen Ansicht), mit deren Hilfe man z.B. ein Script schreiben kann, welches beim Ausführen eine Folge von Ansichten im MultiView erzeugt und einfriert. (siehe Abschnitt Befehlsübersicht)

Unterhalb der MultiView-Ansichten befinden sich einige Symbole:

	MultiView ist eingefroren (Fix-Knopf ist eingeschaltet) (äquivalent zum Befehl PdCpFix)
	MultiView speichert weitere Ansichten (Fix-Knopf ist ausgeschaltet) (äquivalent zum Befehl PdCpFix)
	MultiView speichert die aktuelle Ansicht, sofern sie noch nicht gespeichert ist (äquivalent zum Befehl PdCpAddView)

Konfiguration

MultiView läßt sich im Konfigurationsdialog Ihren Wünschen anpassen. Die vollständige Beschreibung finden Sie auf der entsprechenden Hilfeseite.


SmartFocus

Die ELSA-SmartFocus-Technologie, die in allen POWERdraft Fenstern eingesetzt wird, erspart Ihnen das lästige Umschalten des Eingabefokus zwischen Treiberfenstern und AutoCADs Fenster. Nachdem Sie eine Funktion in einem der Treiberfenster benutzt haben, wird durch Tastatureingaben oder Fadenkreuzbewegungen automatisch AutoCAD das aktive Fenster. Ein ausdrückliches Anklicken wie in anderen Treibern ist unnötig.


Griffrahmen

Ein Griffrahmen ist ein farbiger, rechteckiger Rahmen, der eine Ansicht festlegt. Er hat drei getrennte Funktionsbereiche: innerhalb des Rechtecks, auf dem Rechteck selbst und außerhalb des Rechtecks. Normalerweise kann die Größe eines Griffrahmens durch Anklicken und Ziehen mit der Maus verändert werden, ähnlich wie bei Windows-Fenstern. Andere mögliche Funktionen hängen von der Art der Ansicht ab, die durch den Griffrahmen repräsentiert werden.


Installation

Der POWERdraft-Treiber unterstützt AutoCAD R14 unter Windows NT3.51/4.0 und Windows 95/98

Voraussetzungen

Zur Installation des ELSA POWERdraft-Treibers benötigen Sie:

•	AutoCAD R14, bereits installiert

•	Microsoft Windows NT 4.0 oder Windows 95/98

•	ELSA Synergy II, ELSA GLoria oder ELSA WINNER Grafikkarte - eine Liste der unterstützten ELSA Grafikkarten finden Sie im Kopf der LIESMICH.TXT Datei

•	ELSA's Bildschirmtreiber für die verwendete Windows-Version

•	CD “WINNERware” oder Diskette “POWERdraft for AutoCAD R14”

Installation

•	Installation von CD: Starten Sie CDSETUP.EXE aus dem Wurzelverzeichnis Ihrer WINNERware-CD. Sie können dazu im Datei-Manager oder Windows Explorer CDSETUP.EXE doppelklicken.

•	Installation von Diskette: Der POWERdraft Installationssatz umfasst mehrere Disketten. Starten Sie SETUP.EXE von der ersten Diskette. Während der Installation fordert Setup Sie auf, die weiteren Disketten einzulegen.

•	Installation aus einem separaten Verzeichnis: Das POWERdraft Verzeichnis enthält mehrere Unterverzeichnisse DISK<n>. Starten Sie SETUP.EXE aus dem Unterverzeichnis DISK1.

•	Der Treiber wird in ein getrenntes Verzeichnis installiert.

•	Setup legt eine Programmgruppe mit vier Symbolen an:
- POWERdraft Hilfe: öffnet diese Hilfe
- POWERdraft konfigurieren: konfiguriert POWERdraft als AutoCADs Bildschirmtreiber.
- Originaltreiber konfigurieren: konfiguriert AutoCADs Original-Bildschirmtreiber (CoolWhip).
- Uninstall POWERdraft: Entfernt POWERdraft vom System
HINWEIS: Die beiden ...konfigurieren Symbole funktionieren nur, während AutoCAD nicht läuft.

Zugriffsrechte

Zur Installationszeit benötigt SETUP Schreibzugriff auf folgende Verzeichnisse:

•	AutoCAD Verzeichnis: SETUP erzeugt dort die Datei PD14PATH.INI, in der der Pfad zum Treiber-Verzeichnis steht.

•	Treiber-Verzeichnis: SETUP kopiert fast alle POWERdraft spezifischen Dateien dorthin.

•	Windows-Systemverzeichnis: SETUP kopiert die POWERlib dorthin.

•	Windows-Verzeichnis: SETUP erzeugt dort die Datei DSELSA14.INI, in der die POWERdraft Einstellungen abgespeichert werden.

Zur Laufzeit benötigt POWERdraft Schreibzugriff auf folgende Verzeichnisse:

•	Treiber-Verzeichnis

•	Windows-Verzeichnis: POWERdraft aktualisiert beim Beenden seine Einstellungen in DSELSA14.INI

Zur Konfiguration benötigt das Konfigurationsprogramm Schreibzugriff auf das folgende Verzeichnis:

•	AutoCAD Verzeichnis: Beim Umkonfigurieren des AutoCAD-Bildschirmtreibers (POWERdraft / AutoCADs Originaltreiber) wird die Treiber-DLL DSWHIP.DLL ausgetauscht.

HINWEIS:

Der Treiber basiert auf der ELSA POWERlib, einer treiberunabhängigen, schnellen Grafikbibliothek. Da diese auch von anderen Treibern oder Applikationen benutzt wird, ist diese Komponente u.U. bereits in Ihrem System installiert. Im Fall einer Inkompatibilität der vorgefundenen POWERlib mit dem Treiber läßt Ihnen SETUP die Wahl, ob Sie die Installation abbrechen oder fortsetzen wollen. Das SETUP-Programm zeigt Ihnen an, welche andere(n) Applikation(en) durch die Inkompatibilität nicht mehr lauffähig sein würde(n), wenn Sie die Installation fortsetzen.


Befehlsübersicht

POWERdraft for AutoCAD bringt zusätzliche Befehle, die Sie in AutoCAD benutzen können.

PdCockpit[0|1]	Öffnet/schließt das Cockpit Optionale Parameter: 0 : öffnet Cockpit 1 : schließt Cockpit none: wechselt den Zustand
PdConfig	Öffnet die ELSA POWERdraft Einstellungen, um POWERdraft Einstellungen zu verändern.
PdCpAddView (Cockpit Befehl (*))	Speichert die aktuelle Ansicht im MultiView, sofern sie nicht gerade schon gespeichert wurde.
PdCpFix[0|1] (Cockpit Befehl (*))	Setzt den Fix-Knopf für MultiView im Cockpit Fenster. Optionale Parameter: 0 : schaltet Fix-Knopf aus 1 : schaltet Fix-Knopf ein (friert MultiView ein) ohne: schaltet Fix-Knopf um
PdHelp	Öffnet die ELSA POWERdraft Hilfe.
K PdMagniView[0|1]	Öffnet/schließt das MagniView Optionale Parameter: 0 : öffnet MagniView 1 : schließt MagniView none: wechselt den Zustand
PdMenuOn	wie PdMenu, außer daß der POWERdraft Werkzeugkasten in die Mitte des AutoCAD-Zeichenbereichs positioniert wird. Dies ist hilfreich, wenn z.B. durch Andocken anderer Werkzeugkästen der POWERdraft Werkzeugkasten aus dem sichtbaren Bereich verschwindet.
PdMvSet[m.n]	Setzt m.n als Vergrößerungsfaktor für MagniView.
PdVer	gibt die Version von POWERdraft im AutoCAD-Textfenster aus.

(*) diese Befehle sind nur verfügbar, wenn das entsprechende Tool geöffnet ist.


Konfiguration
POWERdraft Einstellungen

Die POWERdraft Einstellungen dienen zur persönlichen Benutzerkonfiguration des Treibers und der mitgelieferten Tools.

Geöffnet werden die POWERdraft Einstellungen mit Hilfe des Befehls Pdconfig oder durch anklicken der Schaltfläche [image] im POWERdraft-Werkzeugkasten (ist der Werkzeugkasten geschlossen, können Sie ihn mit dem Befehl PdMenu oder PdMenuOn öffnen).

Die POWERdraft Einstellungen beinhalten vier Seiten zur Konfiguration:

•	 Allgemein

•	 Cockpit

•	 MagniView

•	 True Type Fonts

Jede der Seiten enthält eine Vorgabe Schaltfläche mittels derer voreingestellte Werte restauriert werden können.

Durch Anklicken der Schaltfläche OK wird der Dialog POWERdraft Einstellungen beendet und die geänderte Konfiguration übernommen. Wird der Dialog durch anklicken der Schaltfläche Abbruch beendet, werden alle gemachten Änderungen verworfen.

HINWEIS: Die Einstellungen werden in der Datei dselsa14.ini im Windows-Verzeichnis abgespeichert. Editieren Sie diese Datei nicht, während POWERdraft läuft, da der Treiber die Einstellungen überschreibt, wenn AutoCAD beendet wird.

HINWEIS: Ändern Sie in dselsa14.ini keine anderen Einträge als die unten dokumentierten. Normalerweise besteht keine Notwendigkeit, diese Einträge manuell zu ändern, da alle Optionen über die POWERdraft Einstellungen konfiguriert werden können.

Zur Zeit verfügbare Einstellungen in dselsa14.ini sind:

Beschreibung	Abschnitt	Wert	Vorgabe
Cockpit Ein	[POWERdraft]	Cockpit (0, 1)	1
Titelzeile	[Cockpit]	Caption (0, 1)	0
MultiView	[Cockpit]	History (0, 1)	1
MultiView Zeilen x Spalten	[Cockpit]	HistorySize (1,1 .. 10,10)	4,3
Pan & Zoom Sticks	[Cockpit]	Sticks (0, 1)	1
Pan Temp Faktor	[Cockpit]	PanFactor (1 .. 999)	50
Zoom Tempo Faktor	[Cockpit]	ZoomFactor (1 .. 999)	100
Fernsteuerung für Pan & Zoom Sticks	[Cockpit]	RemoteControl (0, 1)	1
Fernsteuerung für Pan	[Cockpit]	RemotePan (*)	2817 (*)
Fernsteuerung für Zoom	[Cockpit]	RemoteZoom (*)	2818 (*)
Fernsteuerung für Tempo	[Cockpit]	RemoteAccelerate (*)	2832 (*)
MagniView Ein	[POWERdraft]	MagniView (0, 1)	0
Titelzeile	[MagniView]	Caption (0, 1)	0
Vergrösserungsfaktor	[MagniView]	MagLevel (1.0 .. 99.99)	1.0

(*) : mögliche Tastenkombinationen für Fernsteuerung:

	linker Mausknopf	mittlerer Mausknopf	rechter Mausknopf
Umschalt	2305	2320	2306
Strg	2561	2576	2562
Umschalt+Strg	2817	2832	2818
Alt	3073	3088	3074
Umschalt+Alt	3329	3344	3330
Strg+Alt	3585	3600	3586
Umschalt+Strg+Alt	3841	3856	3842
disabled	0


Allgemein
POWERdraft Einstellungen: Allgemein

Treiberversion

Dieses Feld enthält die aktuelle Version Ihres POWERdraft-Treibers.

Aktualisierung der Anzeige

Es stehen vier Einstellungsmöglichkeiten, die die Aktualisierung der Anzeige beeinflussen, zur Auswahl.

•	Unmittelbar -  Die Anzege wird nach jeder Operation aktualisiert.

•	Minimales Caching -Im Script-Modus wird die Anzeige nicht häufiger aktualisiert als es die Bildwiederholrate vorgibt (Vorgabe).

•	Moderates Caching - Mit Hilfe des moderaten Cachings wird der Ablauf von Scripten beschleunigt.

•	Aggressives Caching - Der Ablauf von Scripten wird stark beschleunigt. Die Anzeige wird nur noch gelegentlich aktualisiert.

Tools

Mitgelieferte Tools können wahlweise aktiviert bzw. deaktiviert werden.

•	Cockpit - Das Cockpit ist unterteilt in

•	Sticks für dynamisches Paning und Zooming, und

•	MultiView für die grafische Auswahl bisheriger Ansichten.

•	MagniView - POWERdrafts Lupe

Hotkey Kontrolle

Komfortable Zuordnung gewählter Tastenkombinationen zu vorgegebenen Aktionen.

1.	Wählen Sie innerhalb des Listenfeldes Aktion die entsprechende Aktion aus.

2.	Geben Sie die gewünschte Tastenkombination im Hotkey-Anzeigefeld ein.

3.	Für Zoom- und Pan-Aktionen wird ein zusätzlicher Faktor verlangt.

Sehen Sie hier eine Liste der vorgegebenen Tastenkombinationen zu vorgegebenen Aktionen:

Aktion	Beschreibung	Tastenkombination	Faktor
pan nach unten	Zeichnung um Pan-Offset nach unten verschieben.	<Alt><NACH-UNTEN>	Pan-Offset = 0.25
pan nach links	Zeichnung um Pan-Offset nach links verschieben.	<Alt><NACH-LINKS>	Pan-Offset = 0.25
pan nach rechts	Zeichnung um Pan-Offset nach rechts verschieben.	<Alt><NACH-RECHTS>	Pan-Offset = 0.25
pan nach oben	Zeichnung um Pan-Offset nach oben verschieben.	<Alt><NACH-OBEN>	Pan-Offset = 0.25
pan zum Mittelpunkt	Die aktuelle Cursor-Position wird zum neuen Zentrum der Ansicht.	<UMSCHALT><F1>
alles neuzeichnen	Erzwingt ein Neuzeichnen der gesamten Ansicht.	<UMSCHALT><F2>	-
hineinzoomen	Es wird um den Zoom-Faktor in die Zeichnung hineingezoomt. Die momentane Cursor-Position dient als Zoom-Zentrum.	<UMSCHALT><F3>	Zoom-Faktor = 1.5
hineinzoomen über Mittelpunkt	Es wird um den Zoom-Faktor in die Zeichnung hineingezoomt. Der Mittelpunkt der Ansicht  dient als Zoom-Zentrum.	keine	Zoom-Faktor = 1.5
hinauszoomen	Es wird um den Zoom-Faktor in die Zeichnung hinausgezoomt. Die momentan Cursor Position dient als Zoom-Zentrum.	<UMSCHALT><F4>	Zoom-Faktor = 1.5
hinauszoomen über Mittelpunkt	Es wird um den Zoom-Faktor in die Zeichnung hinausgezoomt. Der Mittelpunkt der Ansicht  dient als Zoom-Zentrum.	keine	Zoom-Faktor = 1.5

Anmerkung: Falls eine eingestellte Tastenkombination auch in AutoCAD eine Funktion hat, so steht diese in AutoCAD nicht mehr zur Verfügung.


Cockpit
POWERdraft Einstellungen: Cockpit / MultiView

Look & Feel

Das Erscheinungsbild des Cockpits kann modifiziert werden.

•	Titelzeile

•	Aktivieren Sie die Titelzeile, um das Verschieben und Schließen des Cockpits zu vereinfachen.

•	Deaktivieren Sie die Titelzeile, damit Bildschirmfläche für andere Zwecke frei bleibt.

•	Stil - Es stehen verschiedene Stile für das Cockpit zur Auswahl.

Sticks

konfiguration des dynamischen Verhaltens.

•	Pan-Richtung invertieren - Wahlweises Umschalten der Verschieberichtung beim dynamischen Verschieben.

•	Sensitivität - Die Reaktionsempfindlichkeit kann für Pan- und Zoom- Operationen getrennt eingestellt werden werden. Für Pan-Operationen ist der Faktor 50 voreingestellt, für Zoom-Operationen der Faktor 100. Mögliche Werte für beide Operationen liegen zwischen 1 und 999.

•	Fernsteuerung - Die Fernsteuerung für Pan & Zoom Sticks, sowie für den Schieberegler zur Anpassung der Reaktionsempfindlichkeit beider Operationen, kann ein- und ausgeschaltet werden. Sie ist nur verfügbar, wenn die Pan & Zoom Sticks aktiviert sind. Die Fernsteuerung der drei Elemente (Pan, Zoom, Sensitivität) erfolgt über eine zu wählende Tasten-/Mausknopfkombination (Hotkey). Dazu wechseln sie per Tabulator oder per Mausklick in das entsprechende Eingabefeld und drücken die gewünschte Tastenkombination zusammen mit der gewünschten Maustaste oder eine der Tasten <L>, <R> oder <M> als Alias für die Linke, Rechte oder Mittlere Maustaste. Voreingestellt sind folgende Kombinationen:

Pan	<Strg><Umschalt><LinkeMaustaste>
Zoom	<Strg><Umschalt><RechteMaustaste>
Sensitivität	<Strg><Umschalt><MittlereMaustaste>

Anmerkung: Falls eine für die Fernsteuerung eingestellte Tasten-/Mausknopfkombination auch in AutoCAD eine Funktion hat, so steht diese in AutoCAD nicht mehr zur Verfügung.

MultiView

•	Zeilen - Die Zeilenanzahl der darzustellenden Ansichten kann zwischen 1 und 10 variieren. Voreingestellt sind 3 Zeilen.

•	Spalten - Die Spaltenanzahl der darzustellenden Ansichten kann zwischen 1 und 10 variieren. Voreingestellt sind 4 Spalten.

Bitte beachten Sie die Abschnitte Cockpit und MultiView mit allgemeinen Beschreibungen dieser Treibererweiterungen.


POWERdraft Einstellungen: MagniView

Look & Feel

•	Titelzeile - Die Titelzeile des MagniView kann aktiviert sein, um Verschieben und Schließen des Fensters zu vereinfachen, oder unterdrückt werden, wodurch Bildschirmfläche für andere Zwecke frei bleibt.

Steuerung

•	Vergrösserungs-Faktor  - Ein Vergrösserungsfaktor zwischen 1.0 und 99.99 kann eingestellt werden.

•	Vergrösserungs-Modus

•	LOKAL - Jede geöffnete AutoCAD-Ansicht hat einen “privaten” Vergrösserungsfaktor.

•	GLOBAL - Der eingestellte Vergrösserungsfaktor gilt für alle geöffneten Ansichtsfenster.

Bitte beachten Sie den Abschnitt MagniView mit einer allgemeinen Beschreibung dieser Treibererweiterung.


True Type Fonts
POWERdraft Einstellungen: True Type (TT) Fonts

Whip Kompatibilität - Falls aktiviert, erfolgt die Darstellung von True Type Fonts kompatibel zu der des Originaltreibers.

POWERdraft Kompatibilität

Ist die Kompatibilität zum Originaltreiber deaktiviert, so sind für die Darstellung der True Type Fonts weitere Einstellungen möglich.

•	Umrissene Fonts - True Type Fonts werden nur umrissen dargestellt. Diese Einstellung sorgt für ein beschleunigtes Regenerieren und Neuzeichnen von Zeichnungen, in denen True Type Fonts enthalten sind.

•	Gefüllte Fonts - True Type Fonts werden gefüllt dargestellt.

•	Optische Auflösung - Die relative Anzahl der Eckpunkte die zur Darstellung von True Type Fonts benutzt wird, beeinflusst deren optische Auflösung. Bei einer niedriegen Auflösung erscheinen die Fonts kantig, bei hoher Auflösung ist die Qualität der Darstellung besser. Die Performance von Regen- und Neuzeich-Operationen wird durch die Nutzung hoch aufgelöster True Type Fonts ungünstig beeinflusst.

Die Voreinstellung ist POWERdraft Kompatibilität mit Gefüllten Fonts und einer mittleren Optischen Auflösung.

Wichtig: Änderungen an der TT Font Konfiguration werden erst wirksam mit dem nächsten Regen/RegenAll.

Hinweis: Wenn eine sehr hohe Optischen Auflösung konfiguriert ist, kann es vorkommen, daß Teile des True Type Textes nicht dargestellt werden können; in diesem Fall wird die Meldung

POWERdraft: TT-Font Auflösung ist zu hoch für diesen TT-Font

in AutoCADs Textfenster ausgegeben.

Whip Kompatibilität verglichen mit POWERdraft Kompatibilität

Da POWERdraft und Whip unterschiedliche Display-List-Technologien verwenden, ergeben sich Unterschiede zwischen den beiden Kompatibilitäts-Modi; diese Unterschiede sind in der folgenden Tabelle aufgelistet:

	Whip Kompatibilität	POWERdraft Kompatibilität
MagniView zeigt TT Text an	Nein	Ja
Übersichtsfenster zeigt TT Text an	Nein	Ja
TT Text wird während Cockpit Pan/Zoom angezeigt	Nein	Ja (umrissen)
AutoCADs Anzeigereihenfolge wird berücksichtigt	Nein (TT Text wird immer unterhalb aller übrigen Zeichnungselemente dargestellt)	Ja
Optische Auflösung	automatisch	konfigurierbar
gefüllt/umrissen	immer gefüllt	konfigurierbar
Regen-/Zeichen-Geschwindigkeit	fest	abhängig von Optischer Auflösung
Speicherbedarf	fest	abhängig von Optischer Auflösung
TT Text in Dias (Befehl MACHDIA)	als Gefüllte Fonts mit niedrigster Optischer Auflösung	als Umrissene Fonts mit konfigurierter Optischer Auflösung
TT Text in WMF (erstelle Metadatei; Befehl COPYCLIP)	als Text	als Solids (wenn Gefüllte Fonts konfiguriert sind) oder Polylinien (wenn Umrissene Fonts konfiguriert sind) mit konfigurierter Optischer Auflösung


Versionen
Versionen / letzte Änderungen

Version History

Version 14.00(beta)

14.00.00(beta)

•	Erste Beta Release (Performance Release)

14.00.02(beta)

•	Abstürze im Zusammenhang mit Genius sind behoben.

14.00.05(beta)

•	Cockpit mit Fernsteuerung wurde implementiert.

•	MultiView wurde implementiert; MultiView handhabt nun auch nicht-perspektivische 3D-Ansichten korrekt.

•	Probleme mit AutoSnap sind behoben.

•	Auf Mehrprozessorsystemen wurde der Cursor wurde z.T. nicht gelöscht.

14.00.06(beta)

•	POWERdraft wird in ein getrenntes Treiberverzeichnis installiert (nicht mehr in das AutoCAD-Verzeichnis).

•	Zur komfortablen Einstellung der Treiber-/Tool- Parameter/Optionen wurden die POWERdraft Einstellungen implementiert.

•	Hotkeys für Pan & Zoom sowie fürs Neuzeichnen aller Ansichtsfenster wurden implementiert und sind über die POWERdraft Einstellungen konfigurierbar.

•	Darstellungsfehler im Zusammenhang mit Genius-PowerSnap wurden behoben.

•	Das MultiView wurde hinsichtlich seiner Funktionalität nochmals überarbeitet.

•	Ein Absturz im Zusammenhang mit AMD 2.0 wurde behoben.

14.00.07(beta)

•	Nach dem Verschieben oder Zoomen von Images und einem anschliessenden Regen wurden neben den eigentlichen Images Geister-Images sichtbar. Dieses Problem wurde behoben.

•	Die POWERdraft Einstellungen wurden ergonomisch überarbeitet.

14.00.08(beta)

•	Ein Absturz im Zusammenhang mit Genius Normteilen ist gefixt.

•	Das Verhalten beim Pan/Zoom mit dem Cockpit wurde verbessert.

•	Das Cockpit hat ein neues Erscheinungsbild.

•	Windows 95 wird unterstützt.

14.00.09(beta)

•	ELSA GLoria-XXL wird unterstützt.

•	Darstellungsfehler bei den Cockpit Bitmaps bei 8bpp sind behoben.

Version 14.01

14.01.00

•	Probleme mit der Voransicht, die in der .DWG Datei mit abgespeichert wird, sind behoben:
- Im “Öffnen” Dialog wird nun eine qualititiv bessere Voransicht angezeigt.
- Zeichnungsfremde Elemente werden nun nicht mehr in der Voransicht mit abgespeichert.
- Die Dateigröße ist nun wesentlich kleiner.
Probleme mit Dateien, die mit einer älteren Version von POWERdraft (V14.00.xx(beta)) abgespeichert wurden, können Sie dadurch beheben, indem Sie die Datei mit dem aktuellen POWERdraft erneut abspeichern, nachdem Sie den AutoCAD Befehl BEREINIG aufgerufen haben, wodurch die Dateigröße wieder auf ein Normalmaß gesenkt wird.

14.01.01

•	Das Cockpit führt jetzt auch Zoom- und Pan-Operationen für Modelle im Papierbereich aus.

•	Sub-Entities werden vollständig unterstützt. Als Konsequenz daraus wurde ein Fehler beim Markieren von Skizzierebenen behoben.

14.01.02

•	Ein Problem mit falschen Farben auf versteckten Layern wurde behoben.

•	Schattierte Zeichnungselemente wurden in bestimmten Fällen nicht richtig gelöscht. Das Problem wurde behoben.

Version 14.02

14.02.00(beta)

•	Instabilitäten unter AMD + Genius sind behoben.

•	Probleme beim Starten von AutoCAD zusammen mit Arx-Applikationen sind behoben.

•	Highlight-/Wahl-Operationen wurden beschleunigt und verbrauchen nun weniger Speicher.

•	Zeichnungselemente werden nun nicht mehr über eine gerenderte Szene gezeichnet.

14.02.01(beta)

•	Die gelegentliche Regen-Nachfrage nach einem vollständigem Herauszoomen mit Hilfe des Cockpits tritt nun nicht mehr auf.

•	Die Hotkey-Funktionen "hineinzoomen" and "herauszoomen" wurden dahingehend erweitert, dass nun die aktuelle Cursorposition als Zoomfixpunkt verwendet wird, wohingegen die neuen Hotkey-Funktionen "hineinzoomen über Mittelpunkt" und "herauszoomen über Mittelpunkt" den Ansichtsmittelpunkt als Zoomfixpunkt verwenden.

•	Die neue Hotkey-Funktion "pan zum Mittelpunkt" verschiebt die Ansicht von der Cursorposition zum Ansichtsmittelpunkt.

14.02.02(beta)

•	 MagniView - POWERdraft’s Lupe - wurde implementiert

14.02.03(beta)

•	Ein Problem mit schadhaften POWERdraft Einstellungen unter Windows NT 3.51 wurde behoben.

•	Die POWERdraft Einstellungen wurden um eine Registerkarte zur Einstellung von MagniView-Parametern erweitert.

•	In der Voransichts-Bitmap (abgespeichert in der .DWG Datei) sind nun alle Zeichnungselemente enthalten (mit vorigen Versionen von POWERdraft waren TT Fonts und Raster-Bilder nicht enthalten).

14.02.04(beta)

•	Darstellungsfehler mit dem Genius Wellengenerator wurden behoben.

•	Layer Operationen wurden berichtigt.

•	TT Fonts und Raster Bilder werden in der Druck-Voransicht korrekt angezeigt.

•	Ein Flickern der Ansichtsfensterrahmen wird in den meisten Fällen unterdrückt.

•	Das Verschieben von Ansichtsfenster im Papierbereich hat in einigen Fällen Zeichnungsreste hinterlassen. Dieser Fehler wurde behoben.

•	Der _SAVEIMG Befehl wird vollständig unterstützt.

•	Instabilitäten bei den Befehlen _COPYCLIP, _EXPORT WMF und _EXPORT DWF wurden behoben. Dennoch werden diese Befehle noch nicht vollständig unterstützt.

14.02.06

•	Ein Problem mit ELSAview 3D's Im-Ansichtsfenster-Modus ist ab der Version 1.03.08 von ELSAview behoben. Im Rendermodus wurden frühere Ansichten vom MultiView nicht restauriert.

14.02.07

•	Probleme beim Start von AutoCAD auf Multiprozessorsystemen sind behoben.

•	Kein Flickern mehr beim Vergrößern/Verkleinern des MagniView-Fensters.

Version 14.03

14.03.00(beta)

•	Unterstützung für ELSAinfo.

14.03.01(beta)

•	Unterstützung für ELSA Synergy II

•	Die Modi zur Aktualisierung der Anzeige wurden vollständig überarbeitet.

14.03.02(beta)

•	 TrueType (TT) Fonts werden von POWERdraft vollständig unterstützt.

•	Fix für Mechanical Desktop: Im Szenen-Modus vom Desktop-Browser wurden selektierte Teile nicht markiert im Ansichtsfenster.

14.03.03

•	Dias (Dateiname *.sld; command MACHDIA) werden von POWERdraft unterstützt (über True Type Text in Dia-Dateien siehe Abschnitt TrueType Fonts)

14.03.04

•	Windows Metadateien (Dateiname *.wmf; Befehle COPYCLIP oder ERSTELLE METADATEI) werden von POWERdraft unterstützt (über True Type Text in Windows Metadateien siehe Abschnitt TrueType Fonts)

•	Fix: Unter Windows 95 und Window 98 wurde die Voransicht nicht in der DWG-Datei abgespeichert.

•	Fix:  Bei 8bpp Farbtiefe wurde die Voransichts-Bitmap mit falschen Farben in der DWG-Datei abgespeichert.

•	Fix: Falsche Farben bei 8bpp Farbtiefe auf der Synergy II.

14.03.05

•	Fix: Unter Windows 98 Mehrschirm wurden unter bestimmten Bedingungen die Bitmaps der MultiView-Ansichten nicht angezeigt.

14.03.06

•	Fix: Das Starten von ELSAview 3D (EVSTART) führte zu einem Abbruch von AutoCAD.

14.03.07

•	Fix: Fehlverhalten bei der Nutzung von AutoCADs Objektfang.

14.03.08

•	Das Laden des POWERdraft Werkzeugkastens wurde überarbeitet, um Probleme mit anderen Applikationen beim Starten von AutoCAD zu vermeiden.

14.03.13

•	Mehrschirmbetrieb mit ELSA Synergy II unter Windows NT 4.0 wird unterstützt.

•	ELSA Synergy Force wird unterstützt.

•	ELSA GLoria II wird unterstützt.

•	ELSA GLoria II Pro wird unterstützt.

•	Fix: In seltenen Fällen wurde nach einem Cockpit Zoom/Pan ein falscher View eingestellt.

•	Fix: In seltenen Fällen war ein Regen extrem langsam.

•	Refresh-Probleme in der Plot-Vorschau sind behoben.

Bekannte Probleme und Einschränkungen

•	Raster-Bilder werden immer unterhalb der übrigen Zeichnungselemente dargestellt.

•	Raster-Bilder werden weder im Aerial View Fenster noch im MagniView angezeigt.

•	Bei der Verwendung von Raster-Bildern kann es zu einer leichten Verfälschung der Hintergrundfarbe kommen.

•	Im Zusammenhang mit OpenGL Anwendungen (z.B. auch Autodesk Mechanical Desktop) können Darstellungsfehler auftreten. Diese Fehler wurden bislang nur auf einer GLoria-XL beobachtet. Fehler dieser Art können unterdrückt werden, wenn in ‘Eigenschaften von Anzeige’ unter 'GLoria Einstellungen' die Option 'Erzwinge Buffer Blit' gesetzt wird. Zur Laufzeit können diese Fehler ausserdem durch Betätigen der Tastenkombination für Neuzeichnen (Vorgabe: <UMSCHALT><F2>) unmittelbar korrigiert werden.

•	Während einiger Befehle (PLINIE, MLINIE, SPLINE) kann keine MultiView-Ansicht gewählt werden.

•	Inhalte von Ansichtsfenster im Papierbereich werden im MagniView nicht dargestellt.

•	In einer Dia Datei (Dateiname *.sld, Befehl MACHDIA) wird TT Text nur umrissen dargestellt, es sei denn, in den POWERdraft Einstellungen unter 'TT Fonts' ist 'Whip Kompatibilität' aktiv.

•	Nur Windows NT 4.0 mit ELSA Synergy oder ELSA GLoria II:
Wenn die Option ‘Fensterinhalt beim Ziehen anzeigen’ in ‘Eigenschaften von Anzeige’ eingeschaltet ist, kann es passieren, dass bei heftigem Bewegen einer Fenster-DOS-Box über dem AutoCAD-Fenster diese DOS-Box beschädigt wird, indem POWERdraft darauf zeichnet. Dies kann dann einfach behoben werden z.B. durch Maximieren und Wiederherstellen des DOS-Box-Fensters.